1 HLPTORNO

  Command procedure to convert a .HLP input file to a .RNO output file
  by considering all the HELP entries to be ".HLn" headers.  The usage
  of the procedure is:

	HLPTORNO  input_file

  where the input file (default file type is ".HLP") and read and the
  output file (default file type ".RNO", file name used from input file)
  is written in the current directory.
