C HANDLER.DEF
C
C This module defines all of the inter-module constants used by
C the exit handler.  We define a set of things that the exit
C handler has to do, and then expect the pieces of VNEWS that
C set up those things to stuff appropriate values in this common
C array when the time comes.
C
	Logical EXH_Connected
	Logical EXH_NewsrcRead
	
	Common /EXH/ EXH_Connected,  ! connected to remote news server
	1	     EXH_NewsrcRead  ! xx.newsrc has been read
